coll N〉 part N〈 0 50 100 150 200 250 300 350 400

AA R

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

CT14 + EPS09 NLO pQCD with CT14 as pp reference

0-20 %

20-90 %

= 5.02 TeV NNs ALICE, Pb-Pb c > 20 GeV/ μ Tp < -2.5, μη , -4.0 <

-μ^+μ→Z